Momentum [MeV/c]

20 30 40 50

Upstream inefficiency

0.0 0.5 1.0 1.5 2.0 2.5 3.0 -310× Data MC

θ cos 0.6 0.7 0.8 0.9 1.0

Upstream inefficiency

0.0 0.2 0.4 0.6 0.8 1.0 -310×