Run Number

38000 39000 40000 41000 42000 43000 44000 45000 46000

Calculated Detector Mass (mg/cm^2)

77.5 78 78.5 79 79.5 80 80.5 81 81.5

Run Number

37000 38000 39000 40000 41000 42000 43000 44000 45000 46000

Simulated Stopping Position (cm)

-0.01815

-0.0181

-0.01805

-0.018

-0.01795

-0.0179

m) μ MSDD w.r.t. set74 (

-2 -1.5 -1 -0.5 0

Change of Decay Parameters (w.r.t. set74)

-10

-5 0 5 10 15 20 Set68 Set70 Set71 Set75 Set74 ρΔ δξΔ

m) μ MSDD w.r.t. set74 (

-2 -1.5 -1 -0.5 0

Change 2-Par ECal Slope w.r.t. set 74 (in keV/c)

-1.5 -1 -0.5 0 0.5 1 1.5 2