(radians) θΔ -0.04 -0.02 0 0.02 0.04

Yield (Arbitrary Units)

-310

-210^{Ag Data}

Ag Monte Carlo

(radians) θΔ -0.04 -0.02 0 0.02 0.04

Ratio of Normalized Yield (Data/MC)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

(radians) θΔ -0.04 -0.02 0 0.02 0.04

Yield (Arbitrary Units)

-410

-310

-210

Al Data Al Monte Carlo

(radians) θΔ -0.04 -0.02 0 0.02 0.04

Ratio of Normalized Yield (Data/MC)

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2