obs Likelihood Ratio t

-5 -4 -3 -2 -1 0 1 2 3 4 5

Entries

1

10

Sratio Entries 695 Mean 0.0009621 RMS 1.001 / ndf

2χ 57.11 / 56 p0 2.54± 64.23