)^4 10 × Systematic Uncertainties (

0 2 4 6 8 10 correlations η

Alignment/length

Beam Intensity

Resolution

Positron Interactions

Energy Scale

Chamber Response

(published) ρ (published) δ (published) ξ (final) ρ (final) δ (final) ξ